Tests and documentation for Spring Data Redis.

== Prevent early database interaction

Spring Data Redis requires extra configuration to avoid pre-warming the pool of connections.

With Lettuce:
```
spring.data.redis.lettuce.pool.enabled=false
```

With Jedis:
```
spring.data.redis.jedis.pool.enabled=false
```

