== WebFlux Max Sessions Sample

This sample demonstrates how to configure the maximum number of concurrent sessions for a WebFlux application.

Check the `SecurityConfig.class` to see how the maximum number of sessions is configured.
This sample also contains tests that demonstrate how the maximum number of sessions is enforced.
