[[reactive-logout]]
= Logout

Spring Security provides a logout endpoint by default.
Once logged in, you can `GET /logout` to see a default logout confirmation page, or you can `POST /logout` to initiate logout.
This will:

- clear the `ServerCsrfTokenRepository`, `ServerSecurityContextRepository`, and
- redirect back to the login page

Often, you will want to also invalidate the session on logout.
To achieve this, you can add the `WebSessionServerLogoutHandler` to your logout configuration, like so:

[source,java]
----
@Bean
SecurityWebFilterChain http(ServerHttpSecurity http) throws Exception {
    DelegatingServerLogoutHandler logoutHandler = new DelegatingServerLogoutHandler(
            new WebSessionServerLogoutHandler(), new SecurityContextServerLogoutHandler()
    );

    http
        .authorizeExchange((exchange) -> exchange.anyExchange().authenticated())
        .logout((logout) -> logout.logoutHandler(logoutHandler));

    return http.build();
}
----
