[[tui]]
= Terminal UI
:page-section-summary-toc: 1

NOTE: This feature is experimental and is subject to breaking changes until foundation
and related concepts around framework are getting more stable.

_Terminal UI Framework_ is a toolkit to build rich console apps. This section is
for those using existing features as is. If you're planning to go deeper possibly
by creating your own components, then check xref:appendices/tui/index.adoc[Terminal UI Appendix]
for more detailed documentation.

TIP: xref:appendices/tui/catalog.adoc[Catalog Sample App] is a good place to
study a real application.
